LIBRARY openctm.dll
EXPORTS
    ctmAddAttribMap
    ctmAddUVMap
    ctmAttribPrecision
    ctmCompressionLevel
    ctmCompressionMethod
    ctmDefineMesh
    ctmFileComment
    ctmFreeContext
    ctmGetAttribMapFloat
    ctmGetAttribMapString
    ctmGetError
    ctmGetFloat
    ctmGetFloatArray
    ctmGetInteger
    ctmGetIntegerArray
    ctmGetNamedAttribMap
    ctmGetNamedUVMap
    ctmGetString
    ctmGetUVMapFloat
    ctmGetUVMapString
    ctmErrorString
    ctmLoad
    ctmLoadCustom
    ctmNewContext
    ctmNormalPrecision
    ctmSave
    ctmSaveCustom
    ctmUVCoordPrecision
    ctmVertexPrecision
    ctmVertexPrecisionRel
