LIBRARY openctm.dll
EXPORTS
    ctmAddAttribMap@12 @1
    ctmAddUVMap@16 @2
    ctmAttribPrecision@12 @3
    ctmCompressionLevel@8 @4
    ctmCompressionMethod@8 @5
    ctmDefineMesh@24 @6
    ctmFileComment@8 @7
    ctmFreeContext@4 @8
    ctmGetAttribMapFloat@12 @9
    ctmGetAttribMapString@12 @10
    ctmGetError@4 @11
    ctmGetFloat@8 @12
    ctmGetFloatArray@8 @13
    ctmGetInteger@8 @14
    ctmGetIntegerArray@8 @15
    ctmGetNamedAttribMap@8 @16
    ctmGetNamedUVMap@8 @17
    ctmGetString@8 @18
    ctmGetUVMapFloat@12 @19
    ctmGetUVMapString@12 @20
    ctmErrorString@4 @21
    ctmLoad@8 @22
    ctmLoadCustom@12 @23
    ctmNewContext@4 @24
    ctmNormalPrecision@8 @25
    ctmSave@8 @26
    ctmSaveCustom@12 @27
    ctmUVCoordPrecision@12 @28
    ctmVertexPrecision@8 @29
    ctmVertexPrecisionRel@8 @30
