LIBRARY openctm.dll
EXPORTS
    ctmAddAttribMap = ctmAddAttribMap@12 @1
    ctmAddUVMap = ctmAddUVMap@16 @2
    ctmAttribPrecision = ctmAttribPrecision@12 @3
    ctmCompressionLevel = ctmCompressionLevel@8 @4
    ctmCompressionMethod = ctmCompressionMethod@8 @5
    ctmDefineMesh = ctmDefineMesh@24 @6
    ctmFileComment = ctmFileComment@8 @7
    ctmFreeContext = ctmFreeContext@4 @8
    ctmGetAttribMapFloat = ctmGetAttribMapFloat@12 @9
    ctmGetAttribMapString = ctmGetAttribMapString@12 @10
    ctmGetError = ctmGetError@4 @11
    ctmGetFloat = ctmGetFloat@8 @12
    ctmGetFloatArray = ctmGetFloatArray@8 @13
    ctmGetInteger = ctmGetInteger@8 @14
    ctmGetIntegerArray = ctmGetIntegerArray@8 @15
    ctmGetNamedAttribMap = ctmGetNamedAttribMap@8 @16
    ctmGetNamedUVMap = ctmGetNamedUVMap@8 @17
    ctmGetString = ctmGetString@8 @18
    ctmGetUVMapFloat = ctmGetUVMapFloat@12 @19
    ctmGetUVMapString = ctmGetUVMapString@12 @20
    ctmErrorString = ctmErrorString@4 @21
    ctmLoad = ctmLoad@8 @22
    ctmLoadCustom = ctmLoadCustom@12 @23
    ctmNewContext = ctmNewContext@4 @24
    ctmNormalPrecision = ctmNormalPrecision@8 @25
    ctmSave = ctmSave@8 @26
    ctmSaveCustom = ctmSaveCustom@12 @27
    ctmUVCoordPrecision = ctmUVCoordPrecision@12 @28
    ctmVertexPrecision = ctmVertexPrecision@8 @29
    ctmVertexPrecisionRel = ctmVertexPrecisionRel@8 @30
